--
-- 表的结构 `jl_config`
--

CREATE TABLE IF NOT EXISTS `jl_config` (
`conid` tinyint(4) NOT NULL,
  `proname` char(255) NOT NULL
) ENGINE=InnoDB DEFAULT CHARSET=utf8;

--
-- Indexes for dumped tables
--

--
-- Indexes for table `jl_config`
--
ALTER TABLE `jl_config`
 ADD PRIMARY KEY (`conid`);

--
-- AUTO_INCREMENT for dumped tables
--

--
-- AUTO_INCREMENT for table `jl_config`
--
ALTER TABLE `jl_config`
MODIFY `conid` tinyint(4) NOT NULL AUTO_INCREMENT;