ALTER TABLE `jl_config` ADD `reportswitch` tinyint(4) NOT NULL DEFAULT '1' COMMENT '软件生成报表开关';

ALTER TABLE `jl_config` ADD `signswitch` tinyint(4) NOT NULL DEFAULT '1' COMMENT 'web在线签署开启开关';

ALTER TABLE `jl_config` ADD `launchsignswitch` tinyint(4) NOT NULL DEFAULT '1' COMMENT '发起签署开启开关';