/*
Navicat MySQL Data Transfer

Source Server         : ubuntu-jl
Source Server Version : 50722
Source Host           : 192.168.1.70:3306
Source Database       : calculation

Target Server Type    : MYSQL
Target Server Version : 50722
File Encoding         : 65001

Date: 2019-06-05 10:05:58
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for zh_bill_list
-- ----------------------------
DROP TABLE IF EXISTS `zh_bill_list`;
CREATE TABLE `zh_bill_list` (
  `id` int(8) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增id',
  `name` varchar(60) NOT NULL COMMENT '名称',
  `remark` varchar(60) DEFAULT '' COMMENT '备注',
  `create_time` int(10) NOT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8 COMMENT='工程量清单列表数据表';

-- ----------------------------
-- Records of zh_bill_list
-- ----------------------------
INSERT INTO `zh_bill_list` VALUES ('1', '测试清单', '内容', '1515981196');
