/*
Navicat MySQL Data Transfer

Source Server         : ubuntu-jl
Source Server Version : 50722
Source Host           : 192.168.1.70:3306
Source Database       : calculation

Target Server Type    : MYSQL
Target Server Version : 50722
File Encoding         : 65001

Date: 2019-06-05 10:08:40
*/

SET FOREIGN_KEY_CHECKS=0;

-- ----------------------------
-- Table structure for zh_project_chapter_list
-- ----------------------------
DROP TABLE IF EXISTS `zh_project_chapter_list`;
CREATE TABLE `zh_project_chapter_list` (
  `id` int(8) unsigned NOT NULL AUTO_INCREMENT COMMENT '自增id',
  `name` varchar(60) NOT NULL COMMENT '项目章节名称',
  `remark` varchar(60) DEFAULT '' COMMENT '备注',
  `create_time` int(10) NOT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=2 DEFAULT CHARSET=utf8 COMMENT='项目节列表数据表';

-- ----------------------------
-- Records of zh_project_chapter_list
-- ----------------------------
INSERT INTO `zh_project_chapter_list` VALUES ('1', '测试项目节', '备注内容', '1515981171');
