--
-- 表的结构 `zh_schedule`
--

CREATE TABLE `zh_schedule` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL,
  `total_tp` decimal(30,8) DEFAULT NULL COMMENT '已选台账总金额',
  `plan_gcl` decimal(30,8) DEFAULT NULL COMMENT '计划总工程量',
  `sj_gcl` decimal(30,8) DEFAULT NULL COMMENT '实际完成工程量',
  `plan_tp` decimal(30,8) DEFAULT NULL COMMENT '计划总金额',
  `sj_tp` decimal(30,8) DEFAULT NULL COMMENT '实际完成金额',
  `stage_sj_tp` decimal(30,8) DEFAULT NULL COMMENT '计量期实际计量总额',
  `mode` tinyint(1) DEFAULT '2' COMMENT '计划进度计算方式（默认为工程量）',
  `revising` tinyint(1) NOT NULL DEFAULT '0' COMMENT '是否修订后并未更新数据',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='形象进度表';

--
-- 表的结构 `zh_schedule_audit`
--

CREATE TABLE `zh_schedule_audit` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL COMMENT '标段id',
  `audit_id` int(11) NOT NULL COMMENT '用户id',
  `permission` tinyint(1) NOT NULL DEFAULT '1' COMMENT '权限',
  `in_time` datetime DEFAULT NULL COMMENT '入库时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='形象进度用户权限表';

--
-- 表的结构 `zh_schedule_ledger`
--

CREATE TABLE `zh_schedule_ledger` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL COMMENT '标段id',
  `ledger_id` int(11) NOT NULL COMMENT '台账id',
  `gcl` decimal(30,8) DEFAULT NULL COMMENT '只记录已选最底层树工程量',
  `tp` decimal(30,8) DEFAULT NULL COMMENT '只记录已选最底层树金额',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='进度已选台账';

--
-- 表的结构 `zh_schedule_ledger_history`
--

CREATE TABLE `zh_schedule_ledger_history` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL,
  `ledger_id` int(11) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='旧台账（用于修订后对比新旧台账区别然后调整进度台账）';

--
-- 表的结构 `zh_schedule_ledger_month`
--

CREATE TABLE `zh_schedule_ledger_month` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL COMMENT '标段id',
  `lid` int(11) NOT NULL COMMENT '台账id',
  `yearmonth` varchar(255) COLLATE utf8_unicode_ci NOT NULL COMMENT '计划年月',
  `plan_gcl` decimal(30,8) DEFAULT NULL COMMENT '计划工程量',
  `sj_gcl` decimal(30,8) DEFAULT NULL COMMENT '实际工程量',
  `plan_tp` decimal(30,8) DEFAULT NULL COMMENT '计划金额',
  `sj_tp` decimal(30,8) DEFAULT NULL COMMENT '实际计量金额',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='台账年月记录进度表';

--
-- 表的结构 `zh_schedule_month`
--

CREATE TABLE `zh_schedule_month` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL COMMENT '标段id',
  `yearmonth` varchar(255) COLLATE utf8_unicode_ci NOT NULL COMMENT '计划年月',
  `plan_gcl` decimal(30,8) DEFAULT NULL COMMENT '计划工程量',
  `sj_gcl` decimal(30,8) DEFAULT NULL COMMENT '实际工程量',
  `plan_tp` decimal(30,8) DEFAULT NULL COMMENT '计划金额',
  `sj_tp` decimal(30,8) DEFAULT NULL COMMENT '实际计量金额',
  `stage_gcl_used` tinyint(1) NOT NULL DEFAULT '0' COMMENT '是否已被工程量计量',
  `stage_tp_used` tinyint(1) NOT NULL DEFAULT '0' COMMENT '是否已被金额模式计量',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='进度年月记录汇总台账表';

--
-- 表的结构 `zh_schedule_stage`
--

CREATE TABLE `zh_schedule_stage` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL COMMENT '标段id',
  `yearmonth` varchar(255) COLLATE utf8_unicode_ci NOT NULL COMMENT '计划月份',
  `order` int(11) NOT NULL COMMENT '计量期数',
  `tp` decimal(30,8) DEFAULT NULL COMMENT '本期计量完成金额',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='计量进度-计划月份，计量期选中表';
