ALTER TABLE `zh_project` CHANGE `page_show` `page_show` VARCHAR(5000) CHARACTER SET utf8 COLLATE utf8_unicode_ci NULL DEFAULT '{\"bwtz\":\"1\"}' COMMENT '前台页面或功能展示与隐藏';

ALTER TABLE `zh_change_audit_list` ADD `xmj_code` VARCHAR(500) NULL DEFAULT NULL COMMENT '项目节编号' AFTER `detail`, ADD `xmj_jldy` VARCHAR(500) NULL DEFAULT NULL COMMENT '细目' AFTER `xmj_code`;

ALTER TABLE `zh_login_logging`
ADD COLUMN `type` INT(1) NOT NULL COMMENT '登录类型 1(sso登录) | 2(正常或副密码登录) | 3(接口登录或微信登录)' AFTER `pid`, ADD `show` INT(1) NOT NULL COMMENT '是否显示: 0-显示，1-不显示' AFTER `TYPE`;

