ALTER TABLE `zh_ledger_cooperation` ADD `company` VARCHAR(100) NULL DEFAULT '' COMMENT '单位或备注名，筛选用' AFTER `sign_path`;

--
-- 表的结构 `zh_cooperation_confirm`
--

CREATE TABLE `zh_cooperation_confirm` (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `tid` int(11) NOT NULL COMMENT '标段id',
  `sid` int(11) NOT NULL COMMENT '期id',
  `times` tinyint(11) NOT NULL COMMENT '次数',
  `ledger_id` int(11) NOT NULL COMMENT '台账id',
  `uid` int(11) NOT NULL COMMENT '审批人id',
  `create_time` datetime DEFAULT NULL COMMENT '确认时间',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT='多人协同确认表';


ALTER TABLE `zh_advance_audit`
CHANGE COLUMN `type` `type` TINYINT(1) NOT NULL DEFAULT '0' COMMENT '预付款类型，0为开工预付款，1为材料预付款，2为安全生产费预付款' ;

ALTER TABLE `zh_advance_pay`
CHANGE COLUMN `type` `type` INT(1) NOT NULL DEFAULT '0' COMMENT '预付款类型，0为开工预付款，1为材料预付款，2位安全生产费预付款' ;

-- 接口相关
ALTER TABLE `zh_tender`
ADD COLUMN `s2b_gxby_check`  tinyint(1) UNSIGNED NOT NULL DEFAULT 0 COMMENT '工序报验-检查计量' AFTER `copy_id`,
ADD COLUMN `s2b_gxby_limit`  tinyint(1) UNSIGNED NOT NULL DEFAULT 0 COMMENT '限制上报' AFTER `s2b_gxby_check`,
ADD COLUMN `s2b_dagl_check`  tinyint(1) UNSIGNED NOT NULL DEFAULT 0 COMMENT '档案管理-检查计量' AFTER `s2b_gxby_limit`,
ADD COLUMN `s2b_dagl_limit`  tinyint(1) UNSIGNED NOT NULL DEFAULT 0 COMMENT '档案管理-限制上报' AFTER `s2b_dagl_check`;

ALTER TABLE `zh_pos_0`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_1`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_2`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_3`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_4`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_5`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_6`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_7`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_8`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_9`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_10`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_11`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_12`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_13`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_14`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_15`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_16`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_17`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_18`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_pos_19`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_0`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_1`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_2`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_3`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_4`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_5`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_6`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_7`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_8`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_9`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_10`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_11`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_12`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_13`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_14`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_15`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_16`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_17`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_18`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_pos_19`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_0`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_1`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_2`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_3`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_4`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_5`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_6`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_7`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_8`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_ledger_9`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_0`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_1`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_2`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_3`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_4`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_5`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_6`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_7`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_8`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;

ALTER TABLE `zh_revise_bills_9`
ADD COLUMN `gxby_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `gxby_status`,
ADD COLUMN `gxby_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `gxby_limit`,
ADD COLUMN `dagl_limit`  int(4) NOT NULL DEFAULT -1 COMMENT '计量是否受限，-1不受限，0受限不可计量，1受限可计量' AFTER `dagl_status`,
ADD COLUMN `dagl_ratio`  decimal(6,4) NOT NULL DEFAULT 0 COMMENT '允许计量比例，-1表示不限制' AFTER `dagl_limit`;
