CREATE TABLE `zh_datacollect_tender`  (
  `id` int(11) NOT NULL AUTO_INCREMENT,
  `pid` int(11) NOT NULL,
  `tid` int(11) NOT NULL COMMENT '不展示的标段id',
  PRIMARY KEY (`id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COLLATE=utf8_unicode_ci COMMENT= = '决策大屏标段不选中表';

ALTER TABLE `zh_project` ADD `data_collect_pages` VARCHAR(255) NULL DEFAULT NULL COMMENT '需要展示的大屏字符串，以，分隔' AFTER `data_collect`;
